France
Ultralight
390
799
55
896.948
0.117397
1
0
0
10.8522
20000
1
4.75534
4.26897
0.055
0.0475
-11
-19
0
-0.3
1.2
5
407.667
811.583
407.577
838.296
376.402
838.296
376.448
810.719
391.743
810.615
2
Ultralight
0
672.874
546.918
132.678
1.52965
-0.000342498
0.0187604
19.457
1
Ultralight
1
657.516
545.286
138.191
1.53769
0.013981
0.0180736
19.3207
1
0
0
6
gull
gull
gull
gull
gull
gull
